<template>
  <div ref="chartRef" :class="className" :style="{height:height,width:width}" />
</template>

<script setup>
import { ref, onMounted, onBeforeUnmount, nextTick } from 'vue'
import * as echarts from 'echarts'

const animationDuration = 6000

const props = defineProps({
  className: {
    type: String,
    default: 'chart'
  },
  width: {
    type: String,
    default: '100%'
  },
  height: {
    type: String,
    default: '300px'
  }
})

const chartRef = ref(null)
let chartInstance = null
let resizeObserver = null
let resizeTimer = null

const handleResize = () => {
  if (resizeTimer) {
    clearTimeout(resizeTimer)
  }

  resizeTimer = setTimeout(() => {
    if (chartInstance) {
      try {
        chartInstance.resize()
      } catch (error) {
        console.error('图表重绘失败:', error)
      }
    }
  }, 200)
}

const initResizeListener = () => {
  // 监听窗口大小变化
  window.addEventListener('resize', handleResize)

  // 使用 ResizeObserver 监听容器自身大小变化
  if (typeof ResizeObserver !== 'undefined' && chartRef.value) {
    resizeObserver = new ResizeObserver((entries) => {
      handleResize()
    })
    resizeObserver.observe(chartRef.value)
  }
}

const removeResizeListener = () => {
  // 清理定时器
  if (resizeTimer) {
    clearTimeout(resizeTimer)
    resizeTimer = null
  }

  // 移除窗口监听
  window.removeEventListener('resize', handleResize)

  // 断开 ResizeObserver
  if (resizeObserver) {
    resizeObserver.disconnect()
    resizeObserver = null
  }
}

const initChart = () => {
  if (!chartRef.value) return

  if (chartInstance) {
    chartInstance.dispose()
  }

  chartInstance = echarts.init(chartRef.value, 'macarons')

  chartInstance.setOption({
    tooltip: {
      trigger: 'axis',
      axisPointer: {
        type: 'shadow'
      }
    },
    grid: {
      top: 10,
      left: '2%',
      right: '2%',
      bottom: '3%',
      containLabel: true
    },
    xAxis: [{
      type: 'category',
      data: ['Mon', 'Tue', 'Wed', 'Thu', 'Fri', 'Sat', 'Sun'],
      axisTick: {
        alignWithLabel: true
      }
    }],
    yAxis: [{
      type: 'value',
      axisTick: {
        show: false
      }
    }],
    series: [{
      name: 'pageA',
      type: 'bar',
      stack: 'vistors',
      barWidth: '60%',
      data: [79, 52, 200, 334, 390, 330, 220],
      animationDuration
    }, {
      name: 'pageB',
      type: 'bar',
      stack: 'vistors',
      barWidth: '60%',
      data: [80, 52, 200, 334, 390, 330, 220],
      animationDuration
    }, {
      name: 'pageC',
      type: 'bar',
      stack: 'vistors',
      barWidth: '60%',
      data: [30, 52, 200, 334, 390, 330, 220],
      animationDuration
    }]
  })

  // 图表初始化后立即重绘一次，确保尺寸正确
  nextTick(() => {
    chartInstance.resize()
  })
}

onMounted(() => {
  nextTick(() => {
    initChart()
    initResizeListener()
  })
})

onBeforeUnmount(() => {
  removeResizeListener()
  if (chartInstance) {
    chartInstance.dispose()
    chartInstance = null
  }
})

// 暴露方法给父组件
defineExpose({
  resizeChart: handleResize
})
</script>