/*
 Navicat Premium Data Transfer

 Source Server         : 10.32.2.231
 Source Server Type    : MySQL
 Source Server Version : 50731
 Source Host           : 10.32.2.231:3306
 Source Schema         : nacos

 Target Server Type    : MySQL
 Target Server Version : 50731
 File Encoding         : 65001

 Date: 03/11/2020 09:41:44
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for config_info
-- ----------------------------
DROP TABLE IF EXISTS `config_info`;
CREATE TABLE `config_info`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'content',
  `md5` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8 COLLATE utf8_bin NULL COMMENT 'source user',
  `src_ip` varchar(20) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'source ip',
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT '租户字段',
  `c_desc` varchar(256) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `c_use` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `effect` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `type` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `c_schema` text CHARACTER SET utf8 COLLATE utf8_bin NULL,
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfo_datagrouptenant`(`data_id`, `group_id`, `tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 81 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'config_info' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_info
-- ----------------------------
INSERT INTO `config_info` VALUES (1, 'application-dev.yml', 'DEFAULT_GROUP', 'spring:\n  main:\n    allow-bean-definition-overriding: true\n\n#请求处理的超时时间\nribbon:\n  ReadTimeout: 10000\n  ConnectTimeout: 10000\n\n# feign 配置\nfeign:\n  sentinel:\n    enabled: true\n  okhttp:\n    enabled: true\n  httpclient:\n    enabled: false\n  client:\n    config:\n      default:\n        connectTimeout: 10000\n        readTimeout: 10000\n  compression:\n    request:\n      enabled: true\n    response:\n      enabled: true\n\n# 暴露监控端点\nmanagement:\n  endpoints:\n    web:\n      exposure:\n        include: \'*\'\n', '57470c6d167154919418fa150863b7fb', '2020-11-03 01:40:00', '2020-11-03 01:40:00', NULL, '192.168.100.197', '', 'dgtis-cloud', NULL, NULL, NULL, 'yaml', NULL);
INSERT INTO `config_info` VALUES (1, 'dgtis-gateway-dev.yml', 'DEFAULT_GROUP', 'spring:\r\n  redis:\r\n    host: 10.32.2.232\r\n    port: 6379\r\n    password: \r\n  cloud:\r\n    gateway:\r\n      discovery:\r\n        locator:\r\n          lowerCaseServiceId: true\r\n          enabled: true\r\n      routes:\r\n        # 认证中心\r\n        - id: dgtis-auth\r\n          uri: lb://dgtis-auth\r\n          predicates:\r\n            - Path=/auth/**\r\n          filters:\r\n            # 验证码处理\r\n            - CacheRequestFilter\r\n            - ValidateCodeFilter\r\n            - StripPrefix=1\r\n        # 代码生成\r\n        - id: dgtis-gen\r\n          uri: lb://dgtis-gen\r\n          predicates:\r\n            - Path=/code/**\r\n          filters:\r\n            - StripPrefix=1\r\n        # 定时任务\r\n        - id: dgtis-job\r\n          uri: lb://dgtis-job\r\n          predicates:\r\n            - Path=/schedule/**\r\n          filters:\r\n            - StripPrefix=1\r\n        # 系统模块\r\n        - id: dgtis-system\r\n          uri: lb://dgtis-system\r\n          predicates:\r\n            - Path=/system/**\r\n          filters:\r\n            - StripPrefix=1\r\n\r\n# 不校验白名单\r\nignore:\r\n  whites:\r\n    - /auth/logout\r\n    - /auth/login\r\n    - /*/v2/api-docs\r\n    - /csrf\r\n', '3dc65f689fa45e886dfee7d9e6422d21', '2020-11-03 01:40:00', '2020-11-03 01:40:00', NULL, '192.168.100.197', '', 'dgtis-cloud', NULL, NULL, NULL, 'yaml', NULL);
INSERT INTO `config_info` VALUES (1, 'dgtis-auth-dev.yml', 'DEFAULT_GROUP', 'spring: \r\n  datasource:\r\n    driver-class-name: com.mysql.cj.jdbc.Driver\r\n    url: jdbc:mysql://10.32.2.231:3306/shanghailifeecif?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\r\n    username: root\r\n    password: [REDACTED]  redis:\r\n    host: 10.32.2.232\r\n    port: 6379\r\n    password: \r\n', 'db21fc72925482f67ff3beddd5b56d98', '2020-11-03 01:40:00', '2020-11-03 01:40:00', NULL, '192.168.100.197', '', 'dgtis-cloud', NULL, NULL, NULL, 'yaml', NULL);
INSERT INTO `config_info` VALUES (1, 'dgtis-monitor-dev.yml', 'DEFAULT_GROUP', '# Spring\r\nspring: \r\n  security:\r\n    user:\r\n      name: dgtis\r\n      password: [REDACTED]  boot:\r\n    admin:\r\n      ui:\r\n        title: 通誉服务状态监控\r\n', 'cdf43516f723c84c25e4f456bf478e6e', '2020-11-03 01:40:00', '2020-11-03 01:40:00', NULL, '192.168.100.197', '', 'dgtis-cloud', NULL, NULL, NULL, 'yaml', NULL);
INSERT INTO `config_info` VALUES (1, 'dgtis-system-dev.yml', 'DEFAULT_GROUP', '# Spring\r\nspring: \r\n  redis:\r\n    host: 10.32.2.232\r\n    port: 6379\r\n    password: \r\n  datasource:\r\n    driver-class-name: com.mysql.cj.jdbc.Driver\r\n    url: jdbc:mysql://10.32.2.231:3306/shanghailifeecif?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\r\n    username: root\r\n    password: [REDACTED] Mybatis配置\r\nmybatis:\r\n    # 搜索指定包别名\r\n    typeAliasesPackage: com.dgtis.system\r\n    # 配置mapper的扫描，找到所有的mapper.xml映射文件\r\n    mapperLocations: classpath:mapper/**/*.xml\r\n\r\n# swagger 配置\r\nswagger:\r\n  title: 系统模块接口文档\r\n  license: Powered By dgtis\r\n  licenseUrl: https://dgtis.vip\r\n  authorization:\r\n    name: dgtis OAuth\r\n    auth-regex: ^.*$\r\n    authorization-scope-list:\r\n      - scope: server\r\n        description: 客户端授权范围\r\n    token-url-list:\r\n      - http://localhost:8080/auth/oauth/token\r\n', 'b138e672ea2c4fa4c5c7579f6f879518', '2020-11-03 01:40:00', '2020-11-03 01:40:00', NULL, '192.168.100.197', '', 'dgtis-cloud', NULL, NULL, NULL, 'yaml', NULL);
INSERT INTO `config_info` VALUES (1, 'dgtis-gen-dev.yml', 'DEFAULT_GROUP', '# Spring\r\nspring: \r\n  redis:\r\n    host: 10.32.2.232\r\n    port: 6379\r\n    password: \r\n  datasource: \r\n    driver-class-name: com.mysql.cj.jdbc.Driver\r\n    url: jdbc:mysql://10.32.2.231:3306/shanghailifeecif?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\r\n    username: root\r\n    password: [REDACTED] Mybatis配置\r\nmybatis:\r\n    # 搜索指定包别名\r\n    typeAliasesPackage: com.dgtis.gen.domain\r\n    # 配置mapper的扫描，找到所有的mapper.xml映射文件\r\n    mapperLocations: classpath:mapper/**/*.xml\r\n\r\n# swagger 配置\r\nswagger:\r\n  title: 代码生成接口文档\r\n  license: Powered By dgtis\r\n  licenseUrl: https://dgtis.vip\r\n  authorization:\r\n    name: dgtis OAuth\r\n    auth-regex: ^.*$\r\n    authorization-scope-list:\r\n      - scope: server\r\n        description: 客户端授权范围\r\n    token-url-list:\r\n      - http://localhost:8080/auth/oauth/token\r\n\r\n# 代码生成\r\ngen: \r\n  # 作者\r\n  author: dgtis\r\n  # 默认生成包路径 system 需改成自己的模块名称 如 system monitor tool\r\n  packageName: com.dgtis.system\r\n  # 自动去除表前缀，默认是false\r\n  autoRemovePre: false\r\n  # 表前缀（生成类名不会包含表前缀，多个用逗号分隔）\r\n  tablePrefix: sys_\r\n', 'e5b3d7ce79588a3a924a76284495e60e', '2020-11-03 01:40:00', '2020-11-03 01:40:00', NULL, '192.168.100.197', '', 'dgtis-cloud', NULL, NULL, NULL, 'yaml', NULL);
INSERT INTO `config_info` VALUES (1, 'dgtis-job-dev.yml', 'DEFAULT_GROUP', '# Spring\r\nspring: \r\n  redis:\r\n    host: 10.32.2.232\r\n    port: 6379\r\n    password: \r\n  datasource:\r\n    driver-class-name: com.mysql.cj.jdbc.Driver\r\n    url: jdbc:mysql://10.32.2.231:3306/shanghailifeecif?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\r\n    username: root\r\n    password: [REDACTED] Mybatis配置\r\nmybatis:\r\n    # 搜索指定包别名\r\n    typeAliasesPackage: com.dgtis.job.domain\r\n    # 配置mapper的扫描，找到所有的mapper.xml映射文件\r\n    mapperLocations: classpath:mapper/**/*.xml\r\n\r\n# swagger 配置\r\nswagger:\r\n  title: 定时任务接口文档\r\n  license: Powered By dgtis\r\n  licenseUrl: https://dgtis.vip\r\n  authorization:\r\n    name: dgtis OAuth\r\n    auth-regex: ^.*$\r\n    authorization-scope-list:\r\n      - scope: server\r\n        description: 客户端授权范围\r\n    token-url-list:\r\n      - http://localhost:8080/auth/oauth/token\r\n', 'c7091c638d851997fbb24cf18fdd92dc', '2020-11-03 01:40:00', '2020-11-03 01:40:00', NULL, '192.168.100.197', '', 'dgtis-cloud', NULL, NULL, NULL, 'yaml', NULL);
INSERT INTO `config_info` VALUES (1, 'sentinel-dgtis-gateway', 'DEFAULT_GROUP', '[\r\n    {\r\n        \"resource\": \"dgtis-auth\",\r\n        \"count\": 500,\r\n        \"grade\": 1,\r\n        \"limitApp\": \"default\",\r\n        \"strategy\": 0,\r\n        \"controlBehavior\": 0\r\n    },\r\n	{\r\n        \"resource\": \"dgtis-system\",\r\n        \"count\": 1000,\r\n        \"grade\": 1,\r\n        \"limitApp\": \"default\",\r\n        \"strategy\": 0,\r\n        \"controlBehavior\": 0\r\n    },\r\n	{\r\n        \"resource\": \"dgtis-gen\",\r\n        \"count\": 200,\r\n        \"grade\": 1,\r\n        \"limitApp\": \"default\",\r\n        \"strategy\": 0,\r\n        \"controlBehavior\": 0\r\n    },\r\n	{\r\n        \"resource\": \"dgtis-job\",\r\n        \"count\": 300,\r\n        \"grade\": 1,\r\n        \"limitApp\": \"default\",\r\n        \"strategy\": 0,\r\n        \"controlBehavior\": 0\r\n    }\r\n]', 'c752776a14b00d9d0173938ce1d47f77', '2020-11-03 01:40:00', '2020-11-03 01:40:00', NULL, '192.168.100.197', '', 'dgtis-cloud', NULL, NULL, NULL, 'json', NULL);

-- ----------------------------
-- Table structure for config_info_aggr
-- ----------------------------
DROP TABLE IF EXISTS `config_info_aggr`;
CREATE TABLE `config_info_aggr`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'group_id',
  `datum_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'datum_id',
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT '内容',
  `gmt_modified` datetime(0) NOT NULL COMMENT '修改时间',
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT '租户字段',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfoaggr_datagrouptenantdatum`(`data_id`, `group_id`, `tenant_id`, `datum_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = '增加租户字段' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for config_info_beta
-- ----------------------------
DROP TABLE IF EXISTS `config_info_beta`;
CREATE TABLE `config_info_beta`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'group_id',
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'content',
  `beta_ips` varchar(1024) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'betaIps',
  `md5` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8 COLLATE utf8_bin NULL COMMENT 'source user',
  `src_ip` varchar(20) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'source ip',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT '租户字段',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfobeta_datagrouptenant`(`data_id`, `group_id`, `tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'config_info_beta' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for config_info_tag
-- ----------------------------
DROP TABLE IF EXISTS `config_info_tag`;
CREATE TABLE `config_info_tag`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'group_id',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT 'tenant_id',
  `tag_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'tag_id',
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'content',
  `md5` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8 COLLATE utf8_bin NULL COMMENT 'source user',
  `src_ip` varchar(20) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'source ip',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfotag_datagrouptenanttag`(`data_id`, `group_id`, `tenant_id`, `tag_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'config_info_tag' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for config_tags_relation
-- ----------------------------
DROP TABLE IF EXISTS `config_tags_relation`;
CREATE TABLE `config_tags_relation`  (
  `id` bigint(20) NOT NULL COMMENT 'id',
  `tag_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'tag_name',
  `tag_type` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'tag_type',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'group_id',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT 'tenant_id',
  `nid` bigint(20) NOT NULL AUTO_INCREMENT,
  PRIMARY KEY (`nid`) USING BTREE,
  UNIQUE INDEX `uk_configtagrelation_configidtag`(`id`, `tag_name`, `tag_type`) USING BTREE,
  INDEX `idx_tenant_id`(`tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'config_tag_relation' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for group_capacity
-- ----------------------------
DROP TABLE IF EXISTS `group_capacity`;
CREATE TABLE `group_capacity`  (
  `id` bigint(20) UNSIGNED NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL DEFAULT '' COMMENT 'Group ID，空字符表示整个集群',
  `quota` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '配额，0表示使用默认值',
  `usage` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '使用量',
  `max_size` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
  `max_aggr_count` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '聚合子配置最大个数，，0表示使用默认值',
  `max_aggr_size` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
  `max_history_count` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '最大变更历史数量',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_group_id`(`group_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = '集群、各Group容量信息表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for his_config_info
-- ----------------------------
DROP TABLE IF EXISTS `his_config_info`;
CREATE TABLE `his_config_info`  (
  `id` bigint(64) UNSIGNED NOT NULL,
  `nid` bigint(20) UNSIGNED NOT NULL AUTO_INCREMENT,
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL,
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL,
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL,
  `md5` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0),
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0),
  `src_user` text CHARACTER SET utf8 COLLATE utf8_bin NULL,
  `src_ip` varchar(20) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `op_type` char(10) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT '租户字段',
  PRIMARY KEY (`nid`) USING BTREE,
  INDEX `idx_gmt_create`(`gmt_create`) USING BTREE,
  INDEX `idx_gmt_modified`(`gmt_modified`) USING BTREE,
  INDEX `idx_did`(`data_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 42 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = '多租户改造' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of his_config_info
-- ----------------------------

-- ----------------------------
-- Table structure for permissions
-- ----------------------------
DROP TABLE IF EXISTS `permissions`;
CREATE TABLE `permissions`  (
  `role` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `resource` varchar(512) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `action` varchar(8) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  UNIQUE INDEX `uk_role_permission`(`role`, `resource`, `action`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for roles
-- ----------------------------
DROP TABLE IF EXISTS `roles`;
CREATE TABLE `roles`  (
  `username` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `role` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  UNIQUE INDEX `idx_user_role`(`username`, `role`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of roles
-- ----------------------------
INSERT INTO `roles` VALUES ('nacos', 'ROLE_ADMIN');

-- ----------------------------
-- Table structure for tenant_capacity
-- ----------------------------
DROP TABLE IF EXISTS `tenant_capacity`;
CREATE TABLE `tenant_capacity`  (
  `id` bigint(20) UNSIGNED NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL DEFAULT '' COMMENT 'Tenant ID',
  `quota` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '配额，0表示使用默认值',
  `usage` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '使用量',
  `max_size` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
  `max_aggr_count` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '聚合子配置最大个数',
  `max_aggr_size` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
  `max_history_count` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '最大变更历史数量',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_tenant_id`(`tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = '租户容量信息表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for tenant_info
-- ----------------------------
DROP TABLE IF EXISTS `tenant_info`;
CREATE TABLE `tenant_info`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `kp` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'kp',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT 'tenant_id',
  `tenant_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT 'tenant_name',
  `tenant_desc` varchar(256) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'tenant_desc',
  `create_source` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'create_source',
  `gmt_create` bigint(20) NOT NULL COMMENT '创建时间',
  `gmt_modified` bigint(20) NOT NULL COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_tenant_info_kptenantid`(`kp`, `tenant_id`) USING BTREE,
  INDEX `idx_tenant_id`(`tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 4 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'tenant_info' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of tenant_info
-- ----------------------------
INSERT INTO `tenant_info` VALUES (1, '1', 'dgtis-cloud', 'dgtis-cloud', '基础项目框架', 'nacos', 1604367573056, 1604367573056);

-- ----------------------------
-- Table structure for users
-- ----------------------------
DROP TABLE IF EXISTS `users`;
CREATE TABLE `users`  (
  `username` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `password` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `enabled` tinyint(1) NOT NULL,
  PRIMARY KEY (`username`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of users
-- ----------------------------
INSERT INTO `users` VALUES ('nacos', '$2a$10$EuWPZHzz32dJN7jexM34MOeYirDdFAZm2kuWj7VEOJhhZkDrxfvUu', 1);

SET FOREIGN_KEY_CHECKS = 1;
